\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{21}{|r}|}
\hline
Assembly & \# contigs ($\geq$ 0 bp) & \# contigs ($\geq$ 1000 bp) & \# contigs ($\geq$ 5000 bp) & \# contigs ($\geq$ 10000 bp) & \# contigs ($\geq$ 25000 bp) & \# contigs ($\geq$ 50000 bp) & Total length ($\geq$ 0 bp) & Total length ($\geq$ 1000 bp) & Total length ($\geq$ 5000 bp) & Total length ($\geq$ 10000 bp) & Total length ($\geq$ 25000 bp) & Total length ($\geq$ 50000 bp) & \# contigs & Largest contig & Total length & GC (\%) & N50 & N75 & L50 & L75 & \# N's per 100 kbp \\ \hline
ol-canu-170623 & 3388 & 3388 & 3338 & 2671 & 121 & 3 & 46364927 & 46364927 & 46187705 & 40439853 & 3707809 & 174759 & 3388 & 61211 & 46364927 & 36.53 & 14126 & 11429 & 1230 & 2145 & 0.00 \\ \hline
20171018\_oly\_pacbio.contigs & 11246 & 11246 & 10751 & 5469 & 547 & 17 & 132146852 & 132146852 & 130500089 & 90550146 & 17592727 & 940167 & 11246 & 76280 & 132146852 & 36.40 & 13157 & 9066 & 3329 & 6369 & 0.00 \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
